<template>
    <alert type="warning">
    If you are using NocoDB with version 0.90 onwards, please check out the latest documentation <a href="#" target="_blank">here</a> instead. The documentation for previous versions is no longer maintained and will be completely removed on 30 Jun 2022. See <a href="https://github.com/nocodb/nocodb/issues/1564" target="_blank">v0.90 Important Announcement</a> for more.
    </alert>
</template>

<script>
export default {
  name: "announcement",
}
</script>

<style scoped>

</style>