<script lang="ts" setup>
interface Props {
  checked?: boolean
  size?: 'small' | 'default' | 'large'
  disabled?: boolean
}

const props = withDefaults(defineProps<Props>(), {
  size: 'default',
  disabled: false,
})

const emit = defineEmits(['change', 'update:checked'])

const checked = useVModel(props, 'checked', emit)

const onChange = (e: Event) => {
  emit('change', e, (e.target as HTMLInputElement).checked)
}
</script>

<template>
  <a-checkbox v-model:checked="checked" class="nc-checkbox" :disabled="props.disabled" @change="onChange">
    <slot />
  </a-checkbox>
</template>

<style>
.nc-checkbox {
  @apply flex flex-row !items-center;
}
.nc-checkbox > .ant-checkbox {
  @apply flex !border-0 !p-0 !h-4 !w-4 !rounded !-mt-1.5 mr-0.75 shadow-sm shadow-gray-100;
}
.nc-checkbox > .ant-checkbox > .ant-checkbox-input {
  @apply !p-0 !h-4 !w-4 !border-0;
}
.nc-checkbox > .ant-checkbox::after {
  @apply !border-0 !h-4 !w-4 !rounded;
}
.nc-checkbox > .ant-checkbox > .ant-checkbox-inner {
  @apply !h-4 !w-4 !rounded;
}
</style>
